##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

ndb_rpl_ctype_ucs2_def : bug #34661 rpl_ndb_ctype_ucs2_def fails in 6.2

ndb_rpl_slave_lsu : SEAGULL ndb-force-binlog-format-statement
ndb_rpl_slave_lsu_anyval : SEAGULL ndb-force-binlog-format-statement
ndb_rpl_row_implicit_commit_binlog : SEAGULL ndb-force-binlog-format-statement
