##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

partition_max_parts_hash_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_parts_inv_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_parts_key_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_parts_list_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_parts_range_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_sub_parts_key_list_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_sub_parts_key_range_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_sub_parts_list_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
partition_max_sub_parts_range_innodb : Bug#17719504 2013-11-01 Horst PARTITION_MAX_PARTS ARE FAILING SPORADICLY.
